= *USBSID-Configtool manual*
:author: LouD
:description: This document contains information about the USBSID-Configtool and how to use it
:url-repo: https://www.github.com/LouDnl/USBSID-Configtool
:revdate: {localdate}
:hide-uri-scheme:
:toc:
:toclevels: 4
:toc-placement!:

Author: {author} - generated on {revdate}

toc::[]
[%always]
<<<

== Disclaimer
include::disclaimer.adoc[]


== About
What is there to say, you can configure your board with this tool and it is self explanatory.


== Screens

=== Welcome screen
image:images/configtool/screen-welcome.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-welcome.png",width="600"] +
image:images/configtool/screen-welcome-connected-1.5.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-welcome-connected-1.5.png",width="600"] +
image:images/configtool/screen-welcome-connected-1.3.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-welcome-connected-1.3.png",width="600"] +

=== v1.5 Sockets confirmation message
image:images/configtool/screen-sockets-confirmation.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-sockets-confirmation.png",width="600"] +

=== Sockets screen
image:images/configtool/screen-sockets-1.5.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-sockets-1.5.png",width="600"] +
image:images/configtool/screen-sockets-1.3.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-sockets-1.3.png",width="600"] +

=== Clock screen
image:images/configtool/screen-clock.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-clock.png",width="600"] +

=== LEDS screen
image:images/configtool/screen-leds.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-leds.png",width="600"] +

=== Features screen
image:images/configtool/screen-features-1.5.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-features-1.5.png",width="600"] +
image:images/configtool/screen-features-1.3.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-features-1.3.png",width="600"] +

=== SID tests screen
image:images/configtool/screen-sidtests.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-sidtests.png",width="600"] +

=== Debug screen
image:images/configtool/screen-debug.png[link="https://github.com/LouDnl/USBSID-Pico/blob/master/doc/images/configtool/screen-debug.png",width="600"] +

== Development
More information about USBSID-Configtool is available on the https://github.com/LouDnl/USBSID-Configtool[github repo]


== License
include::license-software.adoc[]

include::license-hardware.adoc[]

Author: {author} - generated on {revdate}
