////
 Copyright (c) 2017 IBM Corporation and others.
 Licensed under Creative Commons Attribution-NoDerivatives
 4.0 International (CC BY-ND 4.0)
   https://creativecommons.org/licenses/by-nd/4.0/
 Contributors:
     IBM Corporation
////
If you make changes to the code, use the Maven `compile` goal to rebuild the application and have the
running Open Liberty instance pick them up automatically:

```
mvn compile
```

To stop the Open Liberty instance, run the Maven `liberty:stop-server` goal:

```
mvn liberty:stop-server
```
