////
 Copyright (c) 2017 IBM Corporation and others.
 Licensed under Creative Commons Attribution-NoDerivatives
 4.0 International (CC BY-ND 4.0)
   https://creativecommons.org/licenses/by-nd/4.0/
 Contributors:
     IBM Corporation
////
=== Running the tests

If the server is still running from the previous steps, stop it using the Maven `liberty:stop-server` goal from the active command-line session in the `start` directory:

```
mvn liberty:stop-server
```

Then, verify that the tests pass using the Maven `verify` goal:

```
mvn verify
```

It may take some time before build is complete. If the tests pass, you will see a similar output to the following:
