////
 Copyright (c) 2018, 2019 IBM Corporation and others.
 Licensed under Creative Commons Attribution-NoDerivatives
 4.0 International (CC BY-ND 4.0)
   https://creativecommons.org/licenses/by-nd/4.0/

 Contributors:
     IBM Corporation
////

[.tab_link.windows_link]
`*WINDOWS*`
[.tab_link.mac_link]
`*MAC*`
[.tab_link.linux_link]
`*LINUX*`

[.tab_content.windows_section.mac_section]
--
Nothing more needs to be done for Docker Desktop.
--

[.tab_content.linux_section]
--
Perform the following steps to return your environment to a clean state.

. Point the Docker daemon back to your local machine:
+
[role=command]
```
eval $(minikube docker-env -u)
```
. Stop your Minikube cluster:
+
[role=command]
```
minikube stop
```

. Delete your cluster:
+
[role=command]
```
minikube delete
```
--





