After you are finished checking out the application, stop the Liberty instance by pressing `CTRL+C` in the command-line session where you ran Liberty. Alternatively, you can run the `liberty:stop` goal from the `finish` directory in another shell session:

include::{common-includes}/os-tabs.adoc[]

[.tab_content.windows_section]
--
[role='command']
```
mvnw.cmd liberty:stop
```
--

[.tab_content.mac_section]
--
[role='command']
```
./mvnw liberty:stop
```
--

[.tab_content.linux_section]
--
[role='command']
```
./mvnw liberty:stop
```
--
