# Generic template backend for Asciidoctor.js
:warning-caption: ⛔️

image:http://unmaintained.tech/badge.svg[]

[WARNING]
====
This project is **deprecated**. +
https://github.com/asciidoctor/asciidoctor.js/releases/tag/v2.2.0[Asciidoctor.js 2.2.0] now provides a built-in template converter. +
====
