include::{libbeat-dir}/shared/integration-link.asciidoc[]

:modulename!:

This module periodically fetches metrics from https://httpd.apache.org/[Apache
HTTPD] servers. The default metricset is `status`.

[float]
=== Compatibility

The Apache metricsets were tested with Apache 2.4.12 and 2.4.20 and are expected to work with
all versions >= 2.2.31 and >= 2.4.16.


[float]
=== Dashboard

The Apache module comes with a predefined dashboard. For example:

image::./images/apache_httpd_server_status.png[]
