= Win32/Industroyer -- Indicators of Compromise

For a description of Industroyer, please see the article about
https://www.welivesecurity.com/2017/06/12/industroyer-biggest-threat-industrial-control-systems-since-stuxnet/[Industroyer]
on https://www.welivesecurity.com[WeLiveSecurity].

== SHA-1 hashes
----
F6C21F8189CED6AE150F9EF2E82A3A57843B587D
CCCCE62996D578B984984426A024D9B250237533
8E39ECA1E48240C01EE570631AE8F0C9A9637187
2CB8230281B86FA944D3043AE906016C8B5984D9
79CA89711CDAEDB16B0CCCCFDCFBD6AA7E57120A
94488F214B165512D2FC0438A581F5C9E3BD4D4C
5A5FAFBC3FEC8D36FD57B075EBF34119BA3BFF04
B92149F046F00BB69DE329B8457D32C24726EE00
B335163E6EB854DF5E08E85026B2C3518891EDA8
----

== IP addresses of C&C servers

WARNING: Most of the servers with these IP addresses were part of Tor network,
         which means that the use of these indicators could result in false
         positives.

- 195.16.88.6
- 46.28.200.132
- 188.42.253.43
- 5.39.218.152
- 93.115.27.57
