-- SQL script to create table `backblaze_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `backblaze_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('23.144.80.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('45.11.36.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('45.11.37.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('45.11.38.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('45.11.39.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('104.153.232.0/23', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('104.153.234.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('104.153.235.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('104.153.236.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('104.153.237.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('104.153.238.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('149.137.128.0/23', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('149.137.130.0/23', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('149.137.132.0/23', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('149.137.134.0/23', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('149.137.136.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('149.137.137.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('149.137.138.0/23', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('149.137.140.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('149.137.141.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('149.137.142.0/24', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('206.190.208.0/22', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('206.190.212.0/23', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('206.190.214.0/23', 'IPv4');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:100::/45', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:1fc::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:1fd::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:1fe::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:1ff::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:200::/45', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:208::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:209::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:20a::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:2fc::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:2fd::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:2fe::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:2ff::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:400::/45', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:4fc::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:4fd::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:4fe::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:4ff::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:500::/45', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:5fc::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:5fd::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:5fe::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:5ff::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:600::/45', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:6fc::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:6fd::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:6fe::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:6ff::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:700::/45', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:800::/45', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:8fc::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:8fd::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:8fe::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:8ff::/48', 'IPv6');
INSERT INTO `backblaze_ips` (`ip_address`, `ip_type`) VALUES ('2605:72c0:a000::/36', 'IPv6');
