-- SQL script to create table `baidu_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `baidu_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('42.199.240.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('45.113.192.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('45.113.193.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('45.113.194.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('103.235.44.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('103.235.45.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('103.235.46.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('103.235.47.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('104.193.88.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('104.193.89.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('104.193.90.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.0.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.0.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.32.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.64.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.64.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.80.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.96.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.112.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.128.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.128.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.144.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.160.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.176.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.192.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.192.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.208.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.224.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.224.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.232.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.240.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.12.240.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.0.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.0.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.32.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.48.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.64.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.64.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.96.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.128.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.128.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.160.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.192.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.192.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.208.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.224.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.224.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.232.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('106.13.240.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('119.75.208.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('119.75.216.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('119.75.222.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.0.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.0.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.32.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.64.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.64.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.96.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.128.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.128.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.160.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.192.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.192.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.208.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.224.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.233.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.240.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.246.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.48.248.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.0.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.64.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.64.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.192.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.192.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.192.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.193.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.194.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.195.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.196.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.196.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.197.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.198.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('120.49.199.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('150.242.120.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('150.242.121.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('150.242.122.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('150.242.123.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('154.85.32.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('154.85.33.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('154.85.34.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('154.85.36.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('154.85.37.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('154.85.40.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('154.85.44.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('154.85.48.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('154.85.56.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('156.240.112.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('156.240.118.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('156.240.119.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('156.240.120.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.0.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.0.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.1.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.5.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.8.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.9.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.11.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.12.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.16.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.32.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.36.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.46.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.48.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.48.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.50.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.52.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.56.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.64.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.64.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.72.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.76.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.96.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.112.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.120.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.124.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.126.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.128.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.128.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.160.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.192.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.192.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.194.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.196.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.200.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.200.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.202.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.204.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.208.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.208.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.220.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.220.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.222.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.224.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.224.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('180.76.240.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.0.0/18', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.0.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.32.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.130.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.130.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.131.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.132.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.132.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.134.0/23', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.136.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.136.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.140.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.144.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.144.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.160.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.200.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.200.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.208.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.216.0/21', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.223.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.224.0/19', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('182.61.247.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('185.10.104.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.46.48.0/20', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.46.61.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.46.62.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.46.63.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.181.120.0/22', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.181.120.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.181.121.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.181.122.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.181.123.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.181.124.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.181.125.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.181.126.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('202.181.127.0/24', 'IPv4');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('2400:da00::/32', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('2400:da00:400::/48', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('2400:da00:404::/48', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('2402:2b40:7000::/36', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('2402:2b40:8000::/36', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('240c:4000::/22', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('240c:4081::/32', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('240c:4082::/32', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('240c:4084::/32', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('240c:4085::/32', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('240c:4088::/32', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('240c:408d:2000::/36', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('240c:409f:4::/46', 'IPv6');
INSERT INTO `baidu_ips` (`ip_address`, `ip_type`) VALUES ('240c:409f:1000::/47', 'IPv6');
