-- SQL script to create table `datadog_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `datadog_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.1.36.99/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.1.219.207/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.18.172.189/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.18.188.104/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.18.197.0/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.35.66.96/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.36.177.119/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.40.2.64/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.40.134.72/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.41.0.88/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.41.176.48/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.42.136.80/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.44.192.120/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.45.0.40/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.90.129.171/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.92.150.182/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.96.7.126/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.120.223.25/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.121.24.234/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.208.6.150/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.210.147.169/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.220.254.141/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.227.186.226/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.229.242.89/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.233.144.0/20', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.233.144.0/20', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.233.144.0/20', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.233.144.0/20', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.233.144.0/20', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.233.144.0/20', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.233.144.0/20', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.233.144.0/20', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('3.233.144.0/20', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('5.60.130.112/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.48.150.244/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.48.239.118/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.48.254.37/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.54.169.48/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.114.211.96/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.115.46.213/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.126.169.175/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.208.126.217/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.208.133.55/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.208.142.17/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.208.255.200/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.209.118.42/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.209.230.111/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.234.54.8/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.236.246.161/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.238.14.57/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.244.85.86/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.244.188.203/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.245.194.43/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.245.200.254/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.246.172.210/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('13.247.164.9/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('15.152.238.192/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('15.161.86.71/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('15.165.240.116/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('15.168.188.85/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('15.184.139.182/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('15.185.189.82/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('15.188.202.64/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('15.188.240.172/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('15.188.243.248/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('16.24.38.13/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('16.24.60.114/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('16.162.136.62/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('16.163.153.45/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.96.16.112/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.96.130.96/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.96.227.72/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.97.147.8/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.98.67.176/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.98.96.240/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.98.131.24/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.98.196.216/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.99.4.112/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.99.34.208/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.99.99.232/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.99.147.8/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.99.209.96/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.99.224.56/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.102.80.189/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.130.113.168/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.139.52.173/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.163.21.55/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.163.59.106/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.166.19.255/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.195.155.52/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.200.120.237/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.215.84.107/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.229.28.50/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('18.229.36.120/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('20.62.248.141/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('20.83.144.189/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('23.20.66.169/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('23.20.198.65/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('23.23.216.60/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.48.76.208/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.94.234.88/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.145.82.128/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.146.154.144/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.159.50.128/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.174.98.16/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.196.179.210/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.202.253.27/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.203.1.9/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.204.83.4/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.206.254.214/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.208.32.189/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.233.140.66/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.234.13.225/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('34.237.4.239/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('35.152.76.8/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('35.154.93.182/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('35.172.85.248/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('35.172.176.208/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('35.176.195.46/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('35.177.43.250/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('40.76.107.170/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('43.198.123.228/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('43.203.72.233/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('43.218.5.202/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('44.192.28.0/25', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('44.208.124.66/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.1.33.14/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.1.61.69/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.9.13.199/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.9.139.134/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.35.61.232/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.44.179.207/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.55.56.26/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.60.189.53/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.67.95.251/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.89.221.151/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.186.167.216/29', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('52.192.175.207/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('54.87.25.183/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('54.92.248.81/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('54.152.215.16/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('54.157.36.5/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('54.158.196.235/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('54.177.155.33/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('54.204.118.171/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('54.226.163.166/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('54.243.237.18/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('63.34.100.178/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('63.35.33.198/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('99.79.87.237/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('100.28.212.0/22', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('107.21.25.247/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('108.137.133.223/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('108.137.188.57/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('157.241.36.106/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('157.241.93.102/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('174.129.34.172/32', 'IPv4');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f18:24e6:b900::/56', 'IPv6');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f18:24e6:b900::/56', 'IPv6');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f18:24e6:b900::/56', 'IPv6');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f18:24e6:b900::/56', 'IPv6');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f18:24e6:b900::/56', 'IPv6');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f18:24e6:b900::/56', 'IPv6');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f18:24e6:b900::/56', 'IPv6');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f18:24e6:b900::/56', 'IPv6');
INSERT INTO `datadog_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f18:24e6:b900::/56', 'IPv6');
