-- SQL script to create table `duckduckbot_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `duckduckbot_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('48.200.33.227/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.72.221.45/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.80.135.7/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.59.0.65/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.72.203.250/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.193.197.146/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.242.135.165/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.146.57.51/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.156.30.123/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.121.121.54/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('134.33.207.189/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.191.245/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('64.236.93.100/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.204.93/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('128.203.214.241/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('57.167.88.38/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.254.123.56/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.248.234.26/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('74.242.194.48/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('131.189.183.241/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('132.220.1.71/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.189.40.18/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.177.16.196/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('131.145.39.118/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.168.43.43/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('130.107.228.224/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('104.43.54.127/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('104.43.55.116/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('104.43.55.117/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('104.43.55.166/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('104.43.55.167/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('108.141.83.74/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('13.89.106.77/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.169.17.165/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('191.233.3.197/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('191.233.3.202/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('191.234.216.178/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('191.234.216.4/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('191.235.201.214/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('191.235.202.38/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('191.235.202.48/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.113.14.159/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.113.3.121/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.12.141.99/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.185.79.15/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.185.79.47/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.191.44.119/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.191.44.16/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.191.44.22/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.191.44.234/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.191.45.212/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.193.12.126/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.193.24.10/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.193.24.251/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.193.25.197/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.193.27.215/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.193.45.113/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.195.108.47/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.197.209.11/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.197.209.27/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.201.15.208/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.204.240.172/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.204.241.148/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.204.242.101/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.204.242.19/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.204.243.55/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.204.246.254/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.204.246.81/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.207.107.181/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.207.72.11/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.207.72.110/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.207.72.113/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.207.72.21/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.207.97.190/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.207.99.197/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.219.43.246/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.219.45.190/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.219.45.67/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.226.133.105/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.3.1.178/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.40.133.240/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.43.150.85/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.43.150.93/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.43.172.120/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.44.222.1/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.49.136.28/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.168.91/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.48.159/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.48.192/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.49.0/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.49.237/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.49.25/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.49.40/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.49.55/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.50.118/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.50.121/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.50.123/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.50.130/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.50.134/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.50.145/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.50.146/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.50.163/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.50.50.46/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.53.134.160/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.53.78.106/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.53.78.123/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.53.78.138/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.53.78.144/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.53.78.236/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.53.91.2/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.53.92.211/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.56.197.58/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.56.197.63/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.61.34.40/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.62.224.44/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.71.12.143/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.72.242.93/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.73.132.240/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.73.202.147/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.75.144.152/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.79.226.26/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.79.238.198/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.79.239.66/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.80.129.80/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.93.28.24/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.99.255.235/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.156.136.79/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.182.131.108/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.195.133.120/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.209.224.56/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.213.46.14/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.228.76.163/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.114.182.153/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.114.182.172/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.114.182.45/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.114.183.196/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.114.183.251/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.114.183.88/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.119.232.146/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.119.232.215/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.119.232.218/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.119.232.251/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.119.232.50/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.64.105.247/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.64.106.11/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.76.162.191/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.76.162.208/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.76.162.247/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.76.163.23/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.76.163.7/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.76.173.151/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.81.250.205/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.88.21.235/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.89.243.175/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.146.225/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.146.235/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.160.167/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.160.177/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.161.32/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.162.149/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.163.250/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.164.109/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.164.147/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.164.189/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.164.215/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.166.111/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.104/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.110/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.19/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.52/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.54/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.61/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.71/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.87/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.88/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.95/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.167.96/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.180.26/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.180.47/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.104.180.53/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.107.40.209/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.116.131.221/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.120.48.122/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.138.90.161/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.138.90.206/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.138.90.233/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.8.253.152/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('51.8.71.117/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.142.24.149/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.142.26.175/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.143.241.111/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.143.242.6/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.143.243.117/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.143.244.81/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.143.247.235/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.143.95.162/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.143.95.204/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.146.58.236/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.146.59.12/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.146.59.154/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.146.59.156/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.146.63.80/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.148.161.87/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.148.165.38/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.25.43/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.28.18/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.28.83/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.30.45/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.56.151/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.58.139/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.58.173/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.58.27/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.58.69/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.60.38/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.149.61.51/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.169.200/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.169.50/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.170.113/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.170.117/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.170.122/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.170.209/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.170.229/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.170.243/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.170.26/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.170.28/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.170.88/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.170.96/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.171.0/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.171.150/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.171.196/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.171.205/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.171.235/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.171.250/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.171.44/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.171.70/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.171.87/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.172.2/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.154.60.82/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.190.37.160/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.16.221/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.16.229/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.19.152/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.20.174/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.20.181/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.20.186/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.20.190/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.20.193/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.20.203/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.20.204/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.20.223/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.20.227/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.20.249/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.21.19/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.21.20/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.21.23/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.21.27/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.21.4/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.21.49/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.21.51/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.21.53/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.21.55/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.224.21.61/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.242.224.168/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('57.152.72.128/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.8.252.26/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.61.142.192/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.54.224.39/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.13.44.19/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.199.55.212/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('132.164.209.198/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.166.171.150/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.207.220.92/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('68.219.152.220/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.127.154.196/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.168.115.250/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.169.28.184/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.150.142.218/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('128.203.132.152/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('64.236.118.43/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('48.217.212.89/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.186.37.211/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.188.89.106/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('135.234.221.112/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('74.179.232.116/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.201.220.8/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.201.197.203/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.201.206.133/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.201.125.59/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.201.141.71/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.168.53.53/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.168.254.119/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.168.227.120/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.169.60.134/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.249.216.104/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.169.177.131/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('48.217.23.236/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.156.154.107/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('48.217.129.210/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.232.51.46/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.255.35.121/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.253.59.76/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('52.250.46.221/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.193.245.229/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.112.58.44/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.253.96.199/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('40.82.218.203/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.237.244.80/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.175.232.228/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.172.49.103/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.250.51.113/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.226.40.135/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.170.75.54/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.182.10.198/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.101.17.173/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.71.69.210/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.216.200.223/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.40.147.172/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.100.136.36/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.100.140.155/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.77.146.108/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.49.129.236/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('13.86.35.212/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.118.11.251/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('172.194.141.49/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.195.58.189/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.212.90.107/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.252.16.193/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.43.152.28/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.64.185.45/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.69.129.205/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.69.131.45/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.80.156.88/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('4.144.182.50/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('48.204.32.87/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('57.155.18.44/32', 'IPv4');
INSERT INTO `duckduckbot_ips` (`ip_address`, `ip_type`) VALUES ('20.99.154.113/32', 'IPv4');
