-- SQL script to create table `googlebot_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `googlebot_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:10::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:11::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:12::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:13::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:14::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:15::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:16::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:17::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:18::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:19::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:1a::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:1b::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:1c::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:1d::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:1e::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:1f::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:20::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:21::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:22::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:23::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:24::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:25::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:26::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:27::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:28::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:29::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:2::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:2a::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:2b::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:2c::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:2d::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:2e::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:2f::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:30::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:31::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:32::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:33::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:34::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:35::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:36::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:37::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:38::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:39::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:3a::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:3b::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:3c::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:3d::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:3e::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:3f::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:40::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:41::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:42::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:44::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:45::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:46::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:47::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:48::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:49::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:4a::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:4b::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:4c::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:4d::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:4e::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:50::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:51::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:52::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:53::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:54::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:55::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:56::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:57::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:58::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:59::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:60::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:61::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:62::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:63::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:64::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:65::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:66::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:67::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:68::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:69::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:6a::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:6b::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:6c::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:6d::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:6e::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:6f::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:70::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:71::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:72::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:73::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:74::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:75::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:76::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:77::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:78::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:79::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:7a::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:7b::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:7c::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:7d::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:80::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:81::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:82::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:83::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:84::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:85::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:86::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:87::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:88::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:90::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:91::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:92::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:93::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:94::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:95::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:96::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:97::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:a0::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:a1::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:a2::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:a3::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:a4::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:a5::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:a6::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:a7::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:a8::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:a9::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:aa::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:ab::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:ac::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:ad::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:ae::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:b0::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:b1::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:b2::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:b3::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:b4::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:b5::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:b6::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:c::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860:4801:f::/64', 'IPv6');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.4.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.4.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.4.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.4.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.4.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.4.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.4.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.4.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.5.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.6.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.6.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.6.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.6.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.6.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.6.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.6.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.6.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.7.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.7.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.7.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.7.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.7.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.7.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.7.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('192.178.7.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.100.182.96/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.101.50.144/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.118.254.0/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.118.66.0/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.126.178.96/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.146.150.144/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.147.110.144/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.151.74.144/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.152.50.64/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.154.114.144/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.155.98.32/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.165.18.176/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.175.160.64/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.176.130.16/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.22.85.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.64.82.64/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.65.242.112/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.80.50.80/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.88.194.0/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.89.10.80/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.89.198.80/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('34.96.162.48/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('35.247.243.240/28', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.64.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.64.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.64.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.64.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.64.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.64.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.64.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.64.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.65.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.65.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.65.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.65.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.65.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.65.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.65.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.65.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.66.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.66.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.66.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.66.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.66.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.66.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.66.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.66.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.67.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.67.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.67.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.68.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.68.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.68.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.68.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.68.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.68.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.68.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.69.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.69.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.69.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.69.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.69.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.69.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.69.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.69.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.70.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.70.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.70.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.70.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.70.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.70.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.70.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.70.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.71.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.71.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.71.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.71.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.71.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.71.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.71.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.71.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.72.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.72.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.72.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.72.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.72.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.72.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.72.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.72.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.73.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.73.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.73.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.73.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.73.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.73.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.73.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.73.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.74.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.74.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.74.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.74.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.74.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.74.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.74.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.74.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.75.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.75.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.75.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.75.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.75.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.75.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.75.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.75.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.76.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.76.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.76.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.76.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.76.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.76.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.76.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.76.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.77.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.77.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.77.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.77.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.77.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.77.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.77.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.77.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.78.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.78.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.78.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.78.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.78.64/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.78.96/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.79.0/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.79.128/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.79.160/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.79.192/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.79.224/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.79.32/27', 'IPv4');
INSERT INTO `googlebot_ips` (`ip_address`, `ip_type`) VALUES ('66.249.79.64/27', 'IPv4');
