-- SQL script to create table `googleservices_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `googleservices_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('8.8.4.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('8.8.8.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('8.35.200.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('8.230.128.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('8.231.0.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('8.234.0.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('8.234.18.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('8.234.20.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('8.234.24.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('8.236.0.0/15', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.0.228.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.0.232.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.1.64.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.2.64.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.2.72.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.2.78.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.2.80.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.2.112.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.3.0.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.3.3.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.3.4.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.3.8.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.3.16.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.3.48.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.3.64.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.3.72.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.3.112.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.4.0.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.4.20.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.4.100.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.4.112.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.4.193.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.4.194.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.4.196.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.4.200.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.4.208.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.4.224.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.5.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.13.64.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.13.80.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.13.96.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.14.224.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.34.192.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.34.208.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.34.224.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.43.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.50.128.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.52.0.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.64.0.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.96.0.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.98.0.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.98.136.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.98.144.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.98.160.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.98.192.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.99.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.100.0.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.101.0.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.101.16.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.101.19.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.101.28.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.103.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.104.0.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.104.16.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.104.24.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.104.26.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.104.28.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.104.32.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.104.48.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.104.53.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.104.54.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.109.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.110.0.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.114.0.0/15', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.116.8.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.116.16.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.116.32.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.118.208.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.118.224.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.119.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.124.64.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.124.96.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.126.0.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.126.224.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.127.128.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.127.144.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.127.152.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.127.176.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.127.181.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.127.182.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.127.192.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.128.0.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.128.38.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.128.40.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.128.50.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.128.56.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.128.192.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.128.240.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.143.0.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.143.72.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.143.80.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.143.96.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.144.0.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.144.128.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.144.160.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.152.70.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.152.82.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.152.88.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.152.99.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.152.128.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.0.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.34.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.36.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.39.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.56.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.60.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.64.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.226.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.228.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.231.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.153.248.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.157.10.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.157.86.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.157.120.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.157.123.128/25', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.157.138.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.157.214.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.157.248.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.158.0.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.158.248.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.167.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.177.0.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.177.38.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.177.56.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.177.67.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.177.78.128/25', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.177.120.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.177.128.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.180.128.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.10.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.20.0/25', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.22.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.30.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.38.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.48.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.62.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.64.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.125.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.126.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.183.128.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.184.10.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.184.20.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.184.28.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.184.36.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.184.60.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.184.124.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.184.128.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.185.0.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('34.188.0.0/14', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.187.128.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.190.96.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.190.240.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.191.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.199.128.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.201.32.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.201.40.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.201.42.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.201.44.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.201.48.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.203.192.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.203.208.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.203.220.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.203.224.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.203.240.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.206.0.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.206.8.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.206.12.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.206.16.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.218.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.219.192.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.220.28.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.220.30.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.229.0.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.230.192.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.230.224.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.235.128.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.235.192.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.235.208.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.235.224.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.242.28.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.242.30.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.243.16.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('35.243.48.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('64.15.112.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('64.233.160.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('66.102.0.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('66.249.64.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('70.32.128.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('72.14.192.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('74.114.24.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('74.125.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.154.0.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.154.112.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.154.122.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.154.124.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.155.240.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.196.64.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.196.72.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.196.80.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.199.64.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.199.240.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('104.237.160.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('107.178.192.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('107.178.224.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('108.170.192.0/18', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('108.177.0.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('130.211.0.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.22.2.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.22.4.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.22.8.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.22.160.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.22.176.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.22.184.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.22.186.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.23.48.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.76.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.78.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.120.0.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.121.8.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('136.124.0.0/15', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('142.250.0.0/15', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('146.148.0.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('162.120.128.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('172.110.32.0/21', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('172.217.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('172.253.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('173.194.0.0/16', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('192.104.160.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('192.178.0.0/15', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('193.186.4.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('199.36.154.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('199.36.156.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('199.192.112.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('199.192.114.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('199.223.237.0/24', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('199.223.238.0/23', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('207.223.160.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('208.65.152.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('208.68.108.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('208.81.188.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('208.117.224.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('209.85.128.0/17', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('216.58.192.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('216.73.80.0/20', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('216.239.32.0/19', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('216.252.220.0/22', 'IPv4');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2001:4860::/32', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2404:6800::/32', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2404:f340::/32', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900::/34', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:4100::/43', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:4130::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:4190::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:41f0::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:4200::/41', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:42b0::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:42d0::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:42f0::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:4300::/40', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:4400::/38', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:4800::/37', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:5000::/38', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:5410::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:5420::/43', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:5440::/42', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:5480::/41', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:5500::/40', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:5600::/39', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:5800::/37', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:6000::/35', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:8010::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:8020::/43', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:8040::/42', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:8080::/41', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:8100::/40', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:8200::/39', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:8400::/38', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:8800::/37', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:9000::/36', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:a000::/35', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1900:c000::/34', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:1::/48', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:2::/47', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:4::/46', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:8::/45', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:10::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:20::/43', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:40::/42', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:80::/41', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:100::/40', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:200::/39', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:400::/38', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:800::/37', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:1000::/36', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:2000::/35', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:4000::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:4020::/43', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:4040::/42', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:4080::/41', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:4100::/40', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:4200::/39', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:4400::/38', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:4800::/37', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:5000::/36', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:6000::/35', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:8000::/40', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:8190::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:81a0::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:81d0::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:81e0::/44', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:8200::/39', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:8400::/38', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:8800::/37', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:9000::/36', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:a000::/35', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1901:c000::/34', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1902::/31', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1904::/30', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2600:1908::/29', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2605:ef80::/32', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2606:40::/32', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2606:73c0::/32', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2607:1c0:241:40::/60', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2607:1c0:300::/40', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2607:f8b0::/32', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2620:11a:a000::/40', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2620:120:e000::/40', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2800:3f0::/32', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2a00:1450::/32', 'IPv6');
INSERT INTO `googleservices_ips` (`ip_address`, `ip_type`) VALUES ('2c0f:fb50::/32', 'IPv6');
