-- SQL script to create table `hostway_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `hostway_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.0.0/20', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.0.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.1.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.2.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.3.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.4.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.5.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.6.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.7.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.8.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.9.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.10.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.11.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.12.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.13.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.14.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.15.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.180.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.180.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.181.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.182.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.183.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.184.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.184.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.185.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.186.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.187.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.188.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.100.191.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.244.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.244.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.245.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.246.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.247.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.250.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.252.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.252.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.253.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.254.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.109.255.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.250.84.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.250.84.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.250.85.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.250.86.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.250.87.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.250.88.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.250.91.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.250.92.0/23', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.250.92.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('61.250.93.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('64.23.67.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('64.23.68.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('64.23.71.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('66.232.136.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('66.232.140.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('66.232.141.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('66.232.142.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('66.232.143.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('66.232.144.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('66.232.145.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('66.232.146.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('66.232.147.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('103.24.8.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('150.107.68.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('203.248.16.0/20', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.109.96.0/21', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.109.96.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.109.97.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.109.98.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.109.99.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.109.100.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.109.101.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.109.102.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.109.103.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.122.0.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.122.1.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.122.6.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.122.9.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('210.122.40.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.176.0/20', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.176.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.177.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.178.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.179.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.180.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.184.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.185.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.186.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.187.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.188.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.189.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.190.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.43.191.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.202.0/23', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.202.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.203.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.204.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.204.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.205.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.206.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.207.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.208.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.209.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.210.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.211.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.212.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.213.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.214.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.216.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.217.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.218.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.219.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.220.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.221.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.222.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.115.223.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.0.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.1.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.3.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.5.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.6.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.7.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.8.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.9.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.10.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.11.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.12.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.13.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.14.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.238.15.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.112.0/20', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.112.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.113.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.114.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.115.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.116.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.117.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.118.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.119.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.120.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.121.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.122.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.123.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.124.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.125.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.126.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.127.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.150.0/23', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.152.0/21', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.152.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.153.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.154.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.155.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.156.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.157.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.158.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.159.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.160.0/21', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.160.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.161.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.162.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.163.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.164.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.165.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.166.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.167.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.168.0/22', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.168.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.169.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.170.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.171.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.172.0/23', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.172.0/24', 'IPv4');
INSERT INTO `hostway_ips` (`ip_address`, `ip_type`) VALUES ('211.239.173.0/24', 'IPv4');
