-- SQL script to create table `ibmcloud_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `ibmcloud_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('5.10.96.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('5.83.159.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('13.116.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('13.120.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('13.121.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('13.122.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('43.245.168.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('46.16.184.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.0.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.8.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.16.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.24.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.24.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.32.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.40.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.64.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.192.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.200.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.22.208.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.97.16.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('50.97.32.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.116.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.116.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.116.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.116.128.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.116.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.117.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.117.0.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.117.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.117.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.117.179.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.117.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.118.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.118.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.118.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('52.118.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('64.5.32.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('64.5.40.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('64.5.48.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('66.37.96.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('66.98.128.0/17', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('66.228.112.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.15.0.0/16', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.18.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.18.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.18.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.214.212.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.214.223.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.228.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.228.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.228.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.228.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.228.252.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('67.228.254.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('69.57.140.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('69.57.144.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('74.86.0.0/16', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('75.126.0.0/16', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('75.126.32.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('75.126.40.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('75.126.48.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('75.126.56.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('75.126.64.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('75.126.72.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('75.126.80.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('75.126.112.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('81.95.144.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('89.38.52.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('89.38.53.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('89.38.54.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('89.144.43.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('103.53.196.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('103.70.48.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('103.106.108.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('103.193.4.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('103.197.160.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('104.207.183.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('104.207.188.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('108.168.128.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('108.168.160.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('108.168.254.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('108.229.8.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('119.81.0.0/16', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('119.81.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('119.81.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('119.81.128.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('119.81.140.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('119.81.144.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('119.81.192.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('128.168.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('128.168.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('128.168.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('128.168.192.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('129.35.190.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('129.41.128.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('129.41.224.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('130.198.0.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('130.198.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('135.90.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('135.90.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('141.125.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('141.125.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('144.69.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('144.69.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('148.59.154.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('149.81.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('149.81.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('149.81.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('149.81.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.112.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.238.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.238.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.238.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.238.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.239.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.239.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.239.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.239.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.240.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.240.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.240.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('150.240.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.85.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.175.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.175.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.176.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.176.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.176.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.176.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.177.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.177.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.177.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.177.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('158.231.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('159.8.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('159.8.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('159.8.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('159.23.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('159.122.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('159.122.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('159.122.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('159.253.128.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('159.253.136.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('159.253.144.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.156.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.156.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.156.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.156.141.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.156.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.199.16.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.199.86.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.202.0.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.202.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.202.128.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.202.160.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.202.192.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('161.202.224.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('162.133.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('162.133.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('163.66.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('163.68.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('163.69.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('163.73.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('163.74.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('163.75.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('163.102.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('163.107.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('163.109.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('165.181.254.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('165.181.255.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('165.192.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('165.192.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('167.94.160.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('168.1.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('168.1.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('168.1.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.0.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.8.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.8.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.12.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.16.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.16.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.24.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.32.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.32.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.36.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.40.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.40.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.44.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.64.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.96.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.192.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.200.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.200.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.204.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.208.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.208.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.212.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.216.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.224.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.224.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.228.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.232.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.232.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.38.236.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.44.0.0/17', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.44.128.0/17', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.45.0.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.45.20.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.45.32.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.45.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.45.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.45.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.46.0.0/17', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.46.128.0/17', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.47.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.47.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.47.80.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.47.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.47.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.48.0.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.48.32.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.48.36.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.48.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.48.80.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.48.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.48.144.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.48.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.50.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.50.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.50.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.50.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.51.0.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.51.32.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.51.128.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.51.160.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.53.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.53.160.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.53.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.54.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.54.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.55.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.55.60.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.55.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.55.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.55.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.56.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.57.128.0/17', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.59.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.59.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.59.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.59.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.60.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.60.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.60.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.60.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.60.208.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.60.248.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.61.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.61.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.61.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.61.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.62.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.62.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.62.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.62.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.63.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.63.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.63.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('169.63.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('170.225.114.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('170.225.160.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('173.192.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('173.192.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('173.192.72.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('173.192.248.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('173.192.254.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('173.193.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('173.193.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('173.247.105.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('173.247.107.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('173.247.115.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('174.36.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('174.36.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('174.36.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('174.37.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('174.37.64.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('174.37.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('174.120.0.0/14', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('174.133.0.0/16', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('174.133.116.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('185.10.228.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('185.13.56.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('185.150.176.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('185.150.177.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('185.228.36.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('185.228.36.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('185.228.37.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('185.228.38.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('185.228.39.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('185.228.68.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('192.107.243.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('192.255.0.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('192.255.30.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('192.255.32.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('198.23.96.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('198.23.104.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('198.23.112.0/20', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('199.20.36.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('199.20.38.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('199.20.39.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('199.166.36.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('199.187.172.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('199.244.72.0/22', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('203.57.74.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('206.253.232.0/21', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('207.44.128.0/17', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('207.218.192.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('207.231.148.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('207.231.152.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('207.231.156.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('207.231.158.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('208.43.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('208.43.128.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('208.43.192.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('208.101.0.0/18', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('209.85.0.0/17', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('209.90.46.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('216.12.192.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('216.12.217.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('216.127.64.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('216.127.71.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('216.185.96.0/19', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('216.234.224.0/24', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('216.234.226.0/23', 'IPv4');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2001:df5:9000::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:1000::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:1100::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:1400::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:1500::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:1800::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:1f00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:2000::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:2100::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:2700::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:2800::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:2900::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:2d00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:2e00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:2f00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:3000::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2402:2f80::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2402:b180:1::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2403:1480:1000::/36', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2403:a280:8000::/36', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2403:ad80:20::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2602:ff1c:1::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2602:ff84:1::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2602:ff84:c::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2602:ff84:11::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2602:ff84:12::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0::/32', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:6::/64', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:7::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:1000::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:1100::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:1900::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:1a00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:1b00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:1c00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:1d00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:1e00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:1f00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:2600::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:2700::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:2900::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3500::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3600::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3700::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3800::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3900::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3a00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3c00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3d00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:4100::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:4200::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:4500::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:4600::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2620:11b:3002::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2803:2f40:ffff::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1100::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1200::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1300::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1400::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1800::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1900::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1c00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1d00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1f00::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:2000::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:2100::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:2200::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:2700::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:2800::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:2900::/40', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a04:f400:3000::/48', 'IPv6');
INSERT INTO `ibmcloud_ips` (`ip_address`, `ip_type`) VALUES ('2a05:dfc7:30::/48', 'IPv6');
