-- SQL script to create table `nhncloud_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `nhncloud_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('1.209.199.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('43.227.116.0/22', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('43.227.116.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('43.227.117.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('43.227.118.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('43.227.119.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('43.254.244.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('45.125.232.0/22', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('45.125.232.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('45.125.233.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('45.125.234.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('45.125.235.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('45.249.160.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('45.249.161.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('45.249.162.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('45.249.163.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('59.150.32.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('59.150.33.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('59.150.34.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('59.150.35.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('59.150.36.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('59.150.37.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('61.42.226.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('61.111.36.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('61.111.37.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('61.111.38.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('61.111.39.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.68.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.69.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.70.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.71.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.80.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.81.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.82.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.83.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.84.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.85.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.86.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.87.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.92.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.93.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.94.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('101.79.95.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.87.116.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.87.117.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.87.118.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.87.119.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.132.32.0/22', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.194.108.0/22', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.194.108.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.194.109.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.194.110.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.194.111.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.218.156.0/22', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.218.156.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.218.157.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.218.158.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.218.159.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.243.200.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.243.201.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.243.202.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('103.243.203.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.18.0/23', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.18.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.19.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.20.0/22', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.20.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.21.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.22.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.23.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.24.0/21', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.24.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.25.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.30.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.31.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.32.0/23', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.32.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('106.249.33.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('110.45.212.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('110.45.213.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('110.45.214.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('110.45.215.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.128.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.129.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.130.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.131.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.132.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.133.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.134.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.135.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.136.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.137.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.138.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.139.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.140.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.141.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.143.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.144.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.145.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.146.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.147.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.150.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.152.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.154.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.156.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.157.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.158.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.159.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.160.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.161.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.162.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.163.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.164.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.166.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.177.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.178.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.180.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.181.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.182.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.183.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.184.0/21', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.184.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.185.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.186.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.187.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.190.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('114.110.191.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('115.88.123.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('115.88.132.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('115.89.67.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('115.89.74.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('115.89.203.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('115.92.64.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('117.52.5.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('117.52.20.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('117.52.122.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('117.52.123.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('117.52.154.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('117.52.155.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('121.254.219.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.32.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.36.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.37.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.38.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.39.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.40.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.41.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.42.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.43.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.44.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.45.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.46.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.47.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.48.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.49.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.50.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.51.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.52.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.53.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.54.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.55.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.57.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.58.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.59.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('125.6.60.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.128.0/17', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.128.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.129.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.130.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.131.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.132.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.133.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.134.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.135.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.136.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.137.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.138.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.139.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.140.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.141.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.142.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.143.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.144.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.145.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.146.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.147.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.148.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.149.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.150.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.151.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.152.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.153.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.154.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.155.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.156.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.158.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.159.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.160.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.161.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.162.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.163.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.165.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.166.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.167.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.168.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.169.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.170.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.171.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.172.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.173.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.174.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.175.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.176.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.177.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.178.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.179.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.180.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.181.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.182.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.183.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.184.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.185.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.186.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.187.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.188.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.189.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.191.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.192.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.193.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.194.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.195.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.196.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.197.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.198.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.199.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.200.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.201.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.202.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.203.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.204.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.205.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.206.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.207.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.208.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.209.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.210.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.211.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.212.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.213.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.214.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.215.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.216.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.217.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.218.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.219.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.220.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.221.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.222.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.223.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.225.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.228.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.229.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.232.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.236.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.237.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.239.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.240.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.241.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.242.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.243.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.244.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.245.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.246.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.247.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.250.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.251.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.252.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.253.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('133.186.255.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.64.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.65.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.66.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.67.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.68.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.70.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.71.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.74.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.75.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.76.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.77.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.78.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.79.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.80.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.81.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.82.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.83.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.84.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.87.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.88.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.89.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.90.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.91.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.92.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.95.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.96.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.100.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.101.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.102.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.103.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.104.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.105.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.106.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.107.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.108.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.109.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.110.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.111.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.112.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.113.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.114.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.115.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.116.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.117.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.118.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.119.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.120.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.121.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.122.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.123.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.124.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.125.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.126.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('180.210.127.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('210.124.216.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('210.206.88.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.32.155.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.50.32.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.50.58.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.56.0.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.56.1.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.56.2.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.56.3.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.56.4.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.56.5.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.56.6.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.56.7.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.168.237.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.170.184.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.172.144.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.172.145.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.180.235.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.188.96.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.188.97.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.188.98.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.188.99.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.188.100.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.188.101.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.188.103.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.255.136.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.255.137.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.255.138.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.255.139.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.255.140.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.255.141.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.255.142.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('211.255.143.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('223.255.200.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('223.255.201.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('223.255.202.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('223.255.204.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('223.255.205.0/24', 'IPv4');
INSERT INTO `nhncloud_ips` (`ip_address`, `ip_type`) VALUES ('223.255.207.0/24', 'IPv4');
