-- SQL script to create table `pingdom_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `pingdom_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('13.232.220.164/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('23.22.2.46/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('23.83.129.219/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('23.92.127.2/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('23.106.37.99/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('23.111.152.74/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('23.111.159.174/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('43.225.198.122/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('43.229.84.12/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('46.20.45.18/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('46.246.122.10/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('50.16.153.186/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.0.204.16/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.24.42.103/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.48.244.35/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.52.34.158/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.52.95.213/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.52.118.192/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.57.132.90/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.59.46.112/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.59.147.246/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.62.12.49/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.63.142.2/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.63.164.147/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.63.167.55/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.67.148.55/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.73.209.122/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.89.43.70/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.194.115.181/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.197.31.124/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.197.224.235/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.198.25.184/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.201.3.199/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.209.34.226/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.209.186.226/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('52.210.232.124/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('54.68.48.199/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('54.70.202.58/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('54.94.206.111/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('64.237.49.203/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('64.237.55.3/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('66.165.229.130/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('66.165.233.234/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('72.46.130.18/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('72.46.131.10/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('76.164.234.106/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('76.164.234.130/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('82.103.136.16/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('82.103.139.165/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('82.103.145.126/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('85.195.116.134/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('89.163.146.247/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('89.163.242.206/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('94.75.211.73/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('94.75.211.74/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('94.247.174.83/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('103.47.211.210/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('108.181.70.3/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('141.125.89.147/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('148.72.170.233/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('148.72.171.17/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('151.106.52.134/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('158.175.95.9/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('162.218.67.34/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('162.253.128.178/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('167.17.67.101/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('168.1.203.46/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('169.44.155.138/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('169.51.2.18/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('169.54.70.214/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('169.63.150.216/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('172.241.112.86/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('173.248.147.18/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('174.34.156.130/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('175.45.132.20/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('177.47.99.26/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('178.162.206.244/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('179.50.12.212/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('184.75.210.90/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('184.75.210.226/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('184.75.214.66/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('184.75.214.98/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('185.39.146.214/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('185.39.146.215/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('185.70.76.23/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('185.93.3.65/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('185.136.156.82/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('185.152.65.167/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('185.180.12.65/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('185.246.208.82/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('190.120.230.7/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('196.240.207.18/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('196.244.191.18/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('196.245.151.42/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('199.87.228.66/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('200.58.101.248/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('207.244.80.239/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('209.58.139.193/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('209.58.139.194/32', 'IPv4');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:200:125d::426/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:200:40cf:225:90ff:fed5:9aea/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2001:1af8:4400:a056::4052/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2001:1af8:4400:a056::4053/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2001:4ba0:ffa5:ed::4003/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2001:4ba0:ffa5:1d5::4004/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2001:4ba0:ffe2:22::1/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2401:c900:1401:71::4078/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2401:e780:1:91::495/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2403:f000:1:100:4096:597:1:100/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2406:da14:48a:7b03::4049/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2406:da1a:b0a:bf02::4050/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f1e:d7c:fd03::4027/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2600:1f1e:d7c:fd05::4028/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2604:4500:5:a::4005/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2604:4500:5:a0::4033/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2604:4500:8:120::4032/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2604:4500:9:5d::4031/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2604:6600:fdc0:12::4066/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2604:86c0:4001:b::4067/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2604:b480:fff9::444/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2604:b480:fffa::4015/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2605:6f80:0:f::462/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2605:fe80:2100:a00f:4::4045/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2605:fe80:2100:a00f:5::4046/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2606:6080:1001::439/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2606:6080:1001:1::459/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2606:6080:1001:4::448/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2606:9880:f000:4:5::4047/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:2601:9b::4211/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3701:f2::4079/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2607:f0d0:3901:62::4201/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2607:fc88:100:26::421/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2804:4c4:dc10:8860::4021/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a00:c98:2050:a03a::4086/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a00:1a28:2000::4055/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a00:9080:1:125::1/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a00:9080:1:453::1/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a00:9080:2145:e::4048/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a01:7a0:2:1754::4056/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a01:7a7:2:205c::4058/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a01:7a7:2:205d::4057/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:750:11:284::442/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:752:100:e::4001/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:752:100:e::4002/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:5740:1:11::4076/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:5740:9:37::4075/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:5740:21:6::4074/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:5740:24:14::4073/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:6ea0:c216::4043/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:6ea0:c305::4041/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:6ea0:cb01::4042/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a02:6ea0:ce02::4044/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1301:146::4070/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1801:11::4101/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a03:8180:1f01:36::4102/128', 'IPv6');
INSERT INTO `pingdom_ips` (`ip_address`, `ip_type`) VALUES ('2a0d:3002:2100:a00c:5::4065/128', 'IPv6');
