-- SQL script to create table `rackspace_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `rackspace_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('5.79.0.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('23.253.0.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('23.253.64.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('23.253.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('23.253.160.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('23.253.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('23.253.224.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('31.222.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('37.188.96.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('46.38.160.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('46.227.46.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('50.56.0.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('50.56.128.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('50.56.144.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('50.56.152.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('50.56.160.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('50.56.192.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('50.57.0.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('50.57.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('50.57.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('50.57.224.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('62.140.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('62.140.218.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('64.39.0.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('64.49.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('64.49.224.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('64.49.232.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('64.49.234.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('64.49.236.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('64.49.240.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.128.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.136.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.140.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.141.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.142.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.144.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.146.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.148.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.152.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.153.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.154.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.156.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.160.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.176.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.184.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.186.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.188.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('65.61.188.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.70.1.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.70.24.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.70.92.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.70.94.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.70.107.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.216.64.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.216.96.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.216.112.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.216.116.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.216.118.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('66.216.120.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('67.23.0.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('67.23.32.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('67.192.0.0/16', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('67.207.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('69.20.0.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('69.20.95.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('69.170.128.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('72.3.128.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('72.4.112.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('72.13.112.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('72.21.36.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('72.21.40.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('72.32.0.0/16', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('72.36.247.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('72.232.0.0/16', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('72.233.0.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('74.120.216.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('74.200.192.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('74.205.0.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('74.205.32.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('74.205.64.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('77.246.32.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('78.40.152.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('78.136.0.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('80.83.144.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('82.211.64.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('82.211.66.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('83.138.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('83.217.96.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('85.133.0.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('87.225.128.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('89.234.0.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('91.208.242.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('92.52.64.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('94.236.0.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('95.138.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('98.129.0.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('98.129.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('98.129.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('98.129.224.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('98.129.228.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('98.129.230.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('98.129.232.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('98.129.240.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('103.4.112.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.0.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.64.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.80.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.96.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.112.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.120.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.124.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.160.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.224.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.130.240.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.239.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.239.160.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.239.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.239.224.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.239.240.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('104.239.248.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('108.166.0.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('108.166.64.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('108.166.80.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('108.166.96.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('108.171.160.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('108.171.176.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('119.9.0.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('119.9.64.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('119.9.96.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('119.9.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('119.9.160.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('120.136.32.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('122.200.132.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('134.0.72.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('134.0.73.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('134.0.75.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('134.8.0.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('134.8.1.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('134.8.2.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('134.213.0.0/16', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('142.0.184.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.20.0.0/16', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.20.220.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.88.96.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.88.100.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.88.104.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.88.108.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.88.112.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.88.116.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.88.120.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.177.0.0/16', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.177.20.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.177.21.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.177.56.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('146.177.74.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('147.75.0.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('147.75.4.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('147.75.8.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('147.75.12.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('147.75.16.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('147.75.20.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('147.75.24.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('148.62.0.0/16', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('151.106.224.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('156.43.59.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('159.135.64.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('159.135.80.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('159.135.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('159.135.160.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('159.135.241.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('159.135.254.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('161.47.0.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('161.47.64.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('161.47.128.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.13.0.0/16', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.209.0.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.209.64.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.209.80.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.209.96.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.216.40.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.218.136.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.242.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.242.160.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.242.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('162.242.224.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('164.40.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('164.138.224.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('164.138.226.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('164.177.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('166.78.0.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('166.78.64.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('166.78.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('166.78.192.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('166.86.0.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('166.86.4.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('166.86.128.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('166.86.192.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('166.86.196.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('166.86.204.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('171.33.145.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('172.99.64.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('172.99.96.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('173.1.184.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('173.45.224.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('173.45.240.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('173.45.248.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('173.203.0.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('173.203.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('173.203.192.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('173.204.89.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('174.143.0.0/16', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('174.143.80.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('180.150.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('184.106.0.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('184.106.32.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('184.106.48.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('184.106.52.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('184.106.54.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('184.106.56.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('184.106.64.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('184.106.128.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('185.16.216.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('185.55.189.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('185.144.228.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('185.180.216.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('185.205.104.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('188.65.56.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('192.65.36.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('192.68.40.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('192.68.42.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('192.237.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('192.237.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('192.237.224.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('193.138.122.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('193.142.244.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('195.5.122.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('195.50.109.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.61.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.61.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.61.224.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.90.20.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.101.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.101.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.101.224.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.101.240.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.101.248.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.210.16.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.210.16.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.210.20.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.254.64.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('198.254.72.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.47.220.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.47.221.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.47.222.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.79.48.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.168.172.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.180.184.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.182.60.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.204.136.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.253.200.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.253.201.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.253.202.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.253.204.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('199.253.207.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('202.168.208.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('203.60.0.0/17', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('204.9.96.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('204.9.188.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('204.13.108.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('204.51.170.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('204.51.224.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('204.51.235.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('204.107.168.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('204.232.128.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('204.232.192.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('204.232.224.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('205.143.66.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('207.97.192.0/18', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('208.78.96.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('208.95.152.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('208.95.156.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.0.201.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.18.112.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.20.64.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.61.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.61.160.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.61.164.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.61.166.0/23', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.61.168.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.61.176.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.61.184.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.114.32.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.114.48.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.163.232.0/21', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('209.163.248.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('212.21.64.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('212.42.224.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('212.42.225.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('212.42.226.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('212.42.231.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('212.42.232.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('212.42.244.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('212.42.247.0/24', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('212.64.128.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('212.100.224.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('216.18.148.0/22', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('216.110.32.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('217.72.240.0/20', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('217.150.96.0/19', 'IPv4');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2001:4800::/32', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2001:4801::/32', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2001:4802::/32', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2401:1800::/32', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2401:1801::/32', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2401:1801:f000::/36', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2407:fa00::/32', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2607:e3c0:a042::/48', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2a00:11b8::/32', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2a00:1a48::/32', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2a0b:440::/32', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2a0b:440:860::/43', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2a0b:441::/32', 'IPv6');
INSERT INTO `rackspace_ips` (`ip_address`, `ip_type`) VALUES ('2a0b:442::/32', 'IPv6');
