-- SQL script to create table `statuscake_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `statuscake_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('13.48.110.214/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('13.48.238.157/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('13.49.141.132/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('13.245.199.158/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('13.245.222.203/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('13.246.54.122/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('13.247.17.60/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('15.160.68.179/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('15.161.88.159/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('16.170.114.19/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('18.102.1.62/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('18.102.253.202/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.13.166.3/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.13.185.113/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.13.188.75/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.22.96.192/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.34.97.213/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.34.185.236/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.40.39.31/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.65.97.99/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.65.97.251/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.65.116.80/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.65.146.108/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.78.123.120/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.92.43.64/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.92.171.119/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.94.175.122/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.94.216.215/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.95.163.121/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.95.214.187/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.96.139.85/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.102.121.250/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.107.112.44/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.116.156.130/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.116.229.102/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.118.53.12/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.118.59.148/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.141.16.202/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.147.219.142/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.150.35.14/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.155.58.180/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.155.143.57/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.155.232.229/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.159.178.196/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.163.147.250/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.165.13.190/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.165.80.145/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.165.120.108/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.165.219.192/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.174.9.202/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.174.16.112/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.174.16.200/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.174.49.169/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.175.19.199/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.175.21.165/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.175.49.24/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('34.175.86.21/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('35.187.119.100/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('35.195.188.224/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('35.197.195.213/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('35.197.232.17/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('35.197.251.116/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('35.198.232.244/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('35.199.96.243/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('35.235.115.146/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('35.247.248.27/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.7.22/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.36.158/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.69.14/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.128.80/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.141.163/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.145.79/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.148.97/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.151.21/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.160.172/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.166.195/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.171.24/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.183.128/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.193.13/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.195.186/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.195.225/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.32.212.56/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.63.26.78/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.63.51.63/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.63.61.213/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.63.76.68/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.63.78.84/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.63.86.120/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.63.88.213/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.63.96.68/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.63.104.11/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.63.121.159/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.76.1.44/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.76.3.112/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.76.122.71/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.76.123.211/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.76.130.43/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.76.134.85/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.76.134.164/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.76.192.50/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.77.75.19/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('45.77.235.246/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('52.48.52.95/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('54.72.247.193/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('54.170.7.14/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('54.194.6.253/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('66.42.84.197/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('68.183.39.102/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('104.156.229.24/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('104.156.255.184/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('104.238.164.105/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('107.191.47.131/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('107.191.57.237/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('108.61.119.153/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('108.61.162.214/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('108.61.173.0/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('108.61.205.201/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('108.61.212.141/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('108.61.215.179/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('108.61.252.147/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('128.199.105.174/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('138.68.83.231/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('138.68.252.209/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('138.197.201.67/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('139.59.95.143/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('139.180.163.76/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('140.82.4.219/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('141.164.35.233/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('141.164.48.161/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('141.164.58.9/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('143.110.160.161/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('143.110.177.18/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('143.110.177.252/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('143.110.177.254/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('143.110.216.47/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('143.110.216.64/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('143.110.216.159/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('143.110.216.228/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('143.198.153.99/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('143.244.178.189/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('146.190.20.1/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('146.190.20.113/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('149.28.30.15/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('149.28.79.140/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('152.42.203.195/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('159.65.19.28/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('159.89.52.219/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('159.223.74.121/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('159.223.175.210/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('161.35.219.158/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('162.243.37.40/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('165.22.125.189/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('165.22.210.218/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('165.227.74.224/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('167.71.61.88/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('167.71.143.76/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('167.172.161.111/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('167.172.163.51/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('167.172.163.238/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('167.172.171.10/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('167.172.171.89/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('167.172.171.150/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('167.172.173.165/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('167.172.175.168/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('174.138.57.253/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('178.62.40.182/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('178.62.83.142/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('178.62.85.105/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('192.81.222.231/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('192.241.213.188/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('192.241.243.72/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('198.199.100.13/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('198.199.112.67/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('198.211.121.217/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('198.211.123.207/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('199.247.12.100/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('206.189.178.14/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('209.97.171.44/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('209.97.178.115/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('216.238.73.102/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('216.238.76.215/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('216.238.77.111/32', 'IPv4');
INSERT INTO `statuscake_ips` (`ip_address`, `ip_type`) VALUES ('216.238.84.207/32', 'IPv4');
