-- SQL script to create table `vultr_ips` and insert IP addresses

CREATE TABLE IF NOT EXISTS `vultr_ips` (
  `ip_address` VARCHAR(45) NOT NULL,
  `ip_type` VARCHAR(10) NOT NULL,
  PRIMARY KEY (`ip_address`)
);

INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('43.224.32.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.0.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.8.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.16.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.24.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.32.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.64.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.96.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.128.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.144.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.152.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.160.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.176.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.184.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.188.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.192.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.208.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.224.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.232.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.240.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.32.248.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.0.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.16.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.24.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.32.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.40.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.44.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.46.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.48.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.64.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.80.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.96.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.104.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.112.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.116.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.120.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.63.124.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.0.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.16.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.32.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.40.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.44.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.48.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.56.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.60.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.64.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.80.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.112.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.128.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.144.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.152.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.160.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.164.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.168.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.176.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.192.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.224.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.232.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.240.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.76.248.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.0.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.8.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.16.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.32.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.48.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.52.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.56.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.60.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.64.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.68.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.72.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.76.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.80.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.84.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.88.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.92.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.112.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.120.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.128.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.136.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.140.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.144.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.160.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.168.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.176.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.184.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.192.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.200.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.208.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.216.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.224.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.232.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('45.77.240.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.176.0.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.176.32.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.176.64.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.176.80.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.176.96.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.176.160.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.176.176.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.176.192.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.176.224.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.177.64.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.177.80.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.177.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.177.112.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('64.237.32.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('65.20.64.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('65.20.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('65.20.112.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.42.32.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.42.48.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.42.64.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.42.80.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.42.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.42.112.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.55.128.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.135.0.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.245.192.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.245.200.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.245.208.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('66.245.216.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('67.219.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.160.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.161.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.162.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.163.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.164.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.165.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.166.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.167.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.168.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.169.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.170.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.171.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.172.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.173.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.174.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.175.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.176.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.177.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.178.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.180.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.181.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.182.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.183.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.184.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.185.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.186.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('68.232.188.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('70.34.192.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('70.34.240.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('78.141.192.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('78.141.208.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('78.141.224.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('80.240.16.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('95.179.128.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('95.179.144.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('95.179.160.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('95.179.176.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('95.179.192.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('95.179.208.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('95.179.224.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('95.179.240.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('96.30.192.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('96.30.208.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('103.43.72.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.156.224.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.156.228.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.156.232.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.156.234.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.156.236.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.156.238.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.156.240.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.156.248.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.156.252.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.156.254.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.207.128.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.207.130.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.207.132.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.207.136.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.207.144.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.207.148.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.207.152.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.207.156.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.128.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.136.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.138.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.140.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.144.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.148.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.152.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.156.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.158.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.160.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.162.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.164.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.166.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.168.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.176.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.178.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.180.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.184.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('104.238.188.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.32.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.40.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.44.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.46.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.48.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.52.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.54.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.56.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.58.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.60.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('107.191.62.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.0.0/18', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.64.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.96.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.97.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.98.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.100.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.103.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.104.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.105.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.108.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.112.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.114.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.115.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.116.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.117.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.118.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.119.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.120.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.122.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.125.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.126.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.128.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.160.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.164.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.168.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.170.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.172.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.176.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.178.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.180.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.184.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.186.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.188.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.190.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.191.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.192.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.194.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.196.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.198.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.200.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.202.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.204.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.206.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.208.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.210.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.212.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.214.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.215.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.216.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.220.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.221.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.222.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.223.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.224.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.225.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.226.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.228.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.230.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.231.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.232.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.234.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.236.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.237.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.238.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.239.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.241.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.242.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.243.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.245.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.246.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.248.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.249.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.250.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.251.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.252.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.253.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.254.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.61.255.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('108.160.128.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('136.244.64.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('136.244.80.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('136.244.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('136.244.112.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('137.220.32.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('137.220.48.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('137.220.52.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('137.220.56.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.84.128.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.84.160.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.84.192.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.84.208.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.84.224.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.180.128.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.180.160.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.180.176.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.180.184.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.180.192.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('139.180.208.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('140.82.0.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('140.82.16.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('140.82.24.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('140.82.32.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('140.82.40.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('140.82.44.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('140.82.48.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('140.82.52.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('140.82.56.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('140.82.60.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('141.164.32.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('144.202.0.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('144.202.16.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('144.202.32.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('144.202.48.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('144.202.64.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('144.202.80.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('144.202.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('144.202.112.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.8.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.16.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.32.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.64.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.112.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.128.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.160.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.192.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.224.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.28.240.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.248.0.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.248.32.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('149.248.48.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('155.138.128.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('155.138.160.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('155.138.176.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('155.138.192.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('155.138.224.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('155.138.240.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('158.247.192.0/18', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('167.179.64.0/18', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.64.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.65.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.66.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.70.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.72.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.80.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.81.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.83.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.84.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.88.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.97.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.104.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.105.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.106.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.108.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.110.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.111.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.112.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.114.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.116.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.120.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('173.199.124.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('185.92.220.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('185.92.222.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('192.0.2.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('192.248.128.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('192.248.144.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('192.248.160.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('192.248.176.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('198.13.32.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('198.13.48.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('198.51.100.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('199.247.0.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('199.247.8.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('199.247.16.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('199.247.24.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('202.182.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('202.182.112.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('203.0.113.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.148.0.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.148.8.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.148.16.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.148.64.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.148.80.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.148.88.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.148.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.148.112.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.148.116.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.148.120.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.246.64.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.246.80.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.246.96.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.246.112.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('207.246.120.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('208.72.152.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('208.76.220.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('208.83.232.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('208.85.16.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('208.167.225.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('208.167.224.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.222.0.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.222.16.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.222.20.0/23', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.222.23.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.222.24.0/22', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.222.28.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.222.29.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.222.30.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.222.31.0/24', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.250.224.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.250.232.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.250.240.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('209.250.248.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('216.128.128.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('216.128.144.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('216.128.160.0/21', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('216.128.176.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('216.155.128.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('216.238.64.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('216.238.96.0/19', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('217.69.0.0/20', 'IPv4');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:2::/48', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:10::/28', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:db8::/32', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2002::/16', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:1000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:1400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:4000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:a800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:6400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:9000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:7000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2401:c080:1000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:5000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:1400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:6000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:6c00::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:9400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:1800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:b000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:ac00::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:4400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2401:c080:1400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:5800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2401:c080:1800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:6800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:1c00::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2401:c080:1c00::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:8000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:2000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:b400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:2400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:2800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2401:c080:2000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:c000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2401:c080:2400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2401:c080:3400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2401:c080:3000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:3000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:c800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2401:c080:3800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:b800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:2c00::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:3400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:8800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:9800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:5c00::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:7400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:1000::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:5400::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2a05:f480:3800::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:9c00::/38', 'IPv6');
INSERT INTO `vultr_ips` (`ip_address`, `ip_type`) VALUES ('2001:19f0:5404::/48', 'IPv6');
