---
title: Cluster sizing
weight: 50
aliases: /portworx-dr/cluster-sizing/
---

:toc:
:imagesdir: /images
:_content-type: ASSEMBLY

include::modules/comm-attributes.adoc[]
include::modules/portworx-dr/metadata-portworx-dr.adoc[]

The OpenShift hub cluster is made of 3 Control Plane nodes and 3 Workers for the cluster; the 3 workers are standard
compute nodes.  For the node sizes we used the **m5.4xlarge** on AWS.

This pattern has only been tested on AWS only right now because of the integration of both Hive and OpenShift
Virtualization. We may publish a later revision that supports more hyperscalers.

include::modules/cluster-sizing-template.adoc[]

